import type { Metadata } from 'next';

export const metadata: Metadata = {
  title: 'Bambu Lab Nozzle i Hotend (Mlaznice/Dizne)',
  description: 'Bambu Lab nozzle mlaznice i hotend za A1, P1, X1. Hardened steel, stainless steel dizne.',
  openGraph: {
    title: 'Bambu Lab Nozzle i Hotend (Mlaznice/Dizne) - Filamenteka',
    description: 'Bambu Lab nozzle mlaznice i hotend za A1, P1, X1. Hardened steel, stainless steel dizne.',
    url: 'https://filamenteka.rs/mlaznice',
  },
  alternates: {
    canonical: 'https://filamenteka.rs/mlaznice',
  },
};

export default function MlaznicaLayout({ children }: { children: React.ReactNode }) {
  return <>{children}</>;
}
