-- Rename vakum column to spulna
ALTER TABLE filaments RENAME COLUMN vakum TO spulna;

-- Update existing data to use 'spulna' instead of 'vakuum'
UPDATE filaments SET spulna = REPLACE(spulna, 'vakuum', 'spulna') WHERE spulna LIKE '%vakuum%';